2550 2700 2850 3000 3150 3300 3450 3600 3750

depth (m)

-117˚ -116˚ -115˚ -114˚ -113˚ -112˚ -111˚ -110˚ -109˚

-19˚

-18˚

-17˚

-16˚

-15˚

WHOI Dorman Orcutt Webb

(101 mm/yr)

(69 mm/yr)

(44 mm/yr)

(76 mm/yr)

(32 mm/yr)

Secondary OBS Array

Primary OBS Array

0 20 40 60 80 100 km

Fig. 1)