2400

2500 2600 2700 2800 2900 3000 3100 3200 3300 3400 3500 3600 3700 3800

depth, m

-114˚ 00'

-114˚ 00'

-113˚ 30'

-113˚ 30'

-113˚ 00'

-113˚ 00'

-112˚ 30'

-112˚ 30'

-112˚ 00'

-112˚ 00'

-17˚ 30' -17˚ 30'

-17˚ 00' -17˚ 00'

-16˚ 30' -16˚ 30' 11

12 14

15 16 21 23 24

33 35 39 40 42 43

51

3 Component

Sites