-1500 -1000 -500 0 500 1000 1500

0 100 200 300 400 500 600

10 10^2

10^3

Depth, km

Variable Viscosity: V=520 kJ mol^{-1} , V=5x10^{-6} m^3 mol^{-1} , μ ’_{max}=10^5

-200 -100 0 100 200

0

50

100

150 X, km